%% SCRAP: archive/legacy/phase-1/Reference/KANBAN-TESTING-GUIDE
%% SOURCE: docs/working/archive/legacy/phase-1/Reference/KANBAN-TESTING-GUIDE.md
%% STATUS: OBSOLETE
%% FITS: none
%% EDITORIAL: lifted — prose rewritten to press voice

\section*{Kanban Workflow Testing Guide (Obsolete)}

This document described the testing procedure for the GitHub Projects~V2 Kanban
automation system, covering the six-stage issue lifecycle:
\textsc{create} $\to$ \textsc{implement} $\to$ \textsc{validate} $\to$
\textsc{approve} $\to$ \textsc{release} $\to$ \textsc{closed}.
The automation it validated is no longer in active use. Retained for
archive completeness only.
