%% SCRAP: archive/quality/audits/codebase-audit-report
%% SOURCE: docs/working/archive/quality/audits/codebase-audit-report.md
%% STATUS: HISTORICAL
%% FITS: none
%% EDITORIAL: lifted — prose rewritten to press voice

\section*{Full Codebase Audit Report (December 2025)}

A comprehensive audit of the StarForth codebase conducted in December 2025
identified 48 issues across six categories. Critical findings included
duplicate \texttt{profiler.h} definitions causing a \texttt{multiple
definition} link error, a \texttt{LOG\_LINE\_MAX} constant defined
inconsistently at 64 bytes in one translation unit and 256 bytes in another,
and seven duplicate documentation files totalling 136~KB of redundant content.

The audit assessed source files, header files, the build system, the test
suite, and documentation. No security vulnerabilities were found. The complete
findings, organized by severity and category, are recorded in the source
document. All 48 issues were addressed in subsequent corrective actions (see
\texttt{corrective-actions.md} in this archive). This report is retained as
the historical baseline for the December 2025 quality remediation program.
